-1 0 1 2 3

Average

45°S-15°S

15°S-15°N

15°N-45°N

45°N-75°N

-2 0 2 4 6 8 global

-1 0 1 2 3

45°S-15°S

15°S-15°N

15°N-45°N

45°N-75°N

-2 0 2 4 6 8 global

-1 0 1 2 3

45°S-15°S

15°S-15°N

15°N-45°N

45°N-75°N

-2 0 2 4 6 8 global

-1 0 1 2 3

Hybrid

-2 0 2 4 6 8

-1 0 1 2 3

-2 0 2 4 6 8

-1 0 1 2 3

-2 0 2 4 6 8

-1 0 1 2 3

IBIS

-2 0 2 4 6 8

-1 0 1 2 3

-2 0 2 4 6 8

-1 0 1 2 3

-2 0 2 4 6 8

-1 0 1 2 3

LPJ

-2 0 2 4 6 8

-1 0 1 2 3

-2 0 2 4 6 8

-1 0 1 2 3

-2 0 2 4 6 8

-1 0 1 2 3

SDGVM

-2 0 2 4 6 8

-1 0 1 2 3

-2 0 2 4 6 8

-1 0 1 2 3

-2 0 2 4 6 8

-1 0 1 2 3

TRIFFID

-2 0 2 4 6 8

-1 0 1 2 3

-2 0 2 4 6 8

-1 0 1 2 3

-2 0 2 4 6 8

-1 0 1 2 3

VECODE

-2 0 2 4 6 8

-1 0 1 2 3

-2 0 2 4 6 8

-1 0 1 2 3

-2 0 2 4 6 8 exp. C+T exp. CT exp. C exp. T

1991-2000 2091-2100 end of experiment

Fig. 6