1900 1950 2000 2050 2100 2100+50 2100+100 40 50 60 70 80 90 NPP (10^{15} g C yr^{-1} ) HYBRID IBIS LPJ SDGVM TRIFFID VECODE

1900 1950 2000 2050 2100 2100+50 2100+100 40 50 60 70 80 90 100 R_H (10^{15} g C yr^{-1} )

1900 1950 2000 2050 2100 2100+50 2100+100 -5

0

5

10 NEP (10^{15} g C yr^{-1} )

Fig. 5