1900 2000 2100 2100+100 40 50 60 70 80 90 NPP (10^{15} g C yr^{-1} )

1900 2000 2100 2100+100 -4 -2 0 2 4 6 8 NEP (10^{15} g C yr^{-1} )

1900 2000 2100 2100+100 400 600 800 1000

1200

1400

Biomass (10^{15} g C)

1900 2000 2100 2100+100 600 800 1000

1200

1400

1600

Soil C (10^{15} g C)

1900 2000 2100 2100+100 20

30

40

50

60 Runoff (10^{12} m^3) CO_2 & climate (CT) CO_2 only (C) climate only (T)

Fig. 4